AES-IMX8E, the ultimate IoT gateway controller

Want to know the best price and sample available
: https://www.acrosser.com/en/Contact/Inquiry

Introducing the AES-IMX8E, the ultimate IoT gateway controller designed to meet all your industrial needs. Powered by NXP i.MX 8M Plus Quad Cortex-A53/M7 Processor, this device is equipped with 4GB DDR4L and 32G eMMC onboard memory for seamless performance. The AES-IMX8E comes with 2 serial ports (RS232/485/422) and 2 CAN-FD channels, ensuring compatibility with a wide range of devices. Additionally, the device is equipped with 2 Mini PCIe connectors for RF modules, making it a versatile solution for all your IoT needs. With support for RTC and TPM 2.0, this gateway controller ensures reliable and secure operation. The AES-IMX8E can operate on a wide voltage range of DC 9V-36V and can withstand temperatures ranging from -20°C to 70°C, making it suitable for use in a variety of harsh environments. The device comes pre-installed with Linux Debian 11, Yocto Kirkstone 5.15, and Ubuntu 22.04, providing you with a range of options to choose from. Upgrade your industrial IoT setup with the AES-IMX8E and experience the highest level of performance and reliability.

Acrosser AES-IMX8E Features

● Powered by NXP i.MX 8M Plus Quad Cortex-A53/M7 Processor
● Onboard DDR4L 4GB / eMMC 32G
● 2 x serial port(RS232/485/422)
● CAN-FD x 2CH
● Mini PCIe connector (For RF Module) x 2
● Support RTC, TPM 2.0
● Wide Voltage DC 9V-36V
● Wide Temperature -20 °C ~ 70 °C
● Pre-Install Linux Debian 11, Yocto kirkstone 5.15, Ubuntu 22.04

Want to know the best price and sample available
: https://www.acrosser.com/en/Contact/Inquiry

# IoT gateway controller  #Powered by NXP

IoT gateway controller  , Powered by NXP