AES-RCA8E Industrial Protocol Gateway into the global market

Acrosser Technology is Introducing the AES-RCA8E Industrial Protocol Gateway, featuring an ARM Cortex-A8 800 MHz RISC Processor for powerful computing performance. With onboard DDR3L 1 GB and eMMC 16GB, as well as multiple I/O interface connections for data collection, this system is designed for efficient and reliable data processing. It also includes a Mini PCIe connector Expansion and an onboard WiFi/Bluetooth Module for added connectivity options.

The system comes pre-installed with Linux Debian and has a wide operating temperature range of -20˚C to 70˚C. With a 9-36VDC Power Input, this Industrial Protocol Gateway is ideal for a variety of industrial and commercial applications.

Interested in AES-RCA8E? Ask for the price/sample.
Please contact us: https://www.acrosser.com/en/Contact/Inquiry

AES-RCA8E Features:
● ARM Cortex-A8 800 MHz RISC Processor
● Onboard DDR3L 1 GB / eMMC 16GB
● Multiple I/O interface connections for data collection
● 9-36VDC Power Input
● Mini PCIe connector Expansion
● Onboard WiFi/Bluetooth Module
● Pre-Install Linux Debian
● Wide operating temperature range -20˚C to 70˚C

Interested in AES-RCA8E? Ask for the price/sample.
Please contact us: https://www.acrosser.com/en/Contact/Inquiry

# Industrial Protocol Gateway

# IoT Gateway

Industrial Protocol Gateway, IoT Gateway